Christmas countdown

The countdown to Christmas began this evening following the official turning on of the lights in the town hall square – renamed Christmas Square for the duration of the festive period. An explosion of gold and silver confetti cascaded down and fireworks signalled the start of festivities. There are numerous fairground type rides and activities dotted around, including the very popular ice rink, which will all remain in place until January 7 – the day after 3 Kings

Click on "Read more" icon to read full article