R.I.P Sticky Vicky

It has been announced that Victoria Aragüés Gadea, better known to millions as ´Sticky Vicky´ passed away this morning - Wednesday 29 November, aged 80. A trained ballerina, she came to Benidorm in the early 80´s where she soon became a hit with British holidaymakers for her ´X-rated magic show´- performing several times a night in bars and clubs across the popular Rincon de Loix. A visit to Benidorm wasn´t complete without seeing her... at least once!

Click on ´Read more´icon to read full article